Update on TRACY-2 documentation

Michael Böge, Michael.Boege@psi.ch $Log: tracy.sgml,v $ Revision 1.2 1999/06/02 12:05:46 boege header section cernlib.h and corr.h added Revision 1.1 1998/07/28 07:03:40 boege Initial revision

This document gives a summary of all changes made since the release of the original PASCAL version by J. Bengtsson.

Contents

1 Introduction 1 1.1 The PASCAL to C conversion . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 2

2 Installation 2

3 Getting started 3

4 TRACY C library routines 4 4.1 Changed C library routines . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4 4.2 Added C library routines . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 5

5 TRACY C library files 8 5.1 C library header files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 8 5.1.1 Main header files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9 5.1.2 FFT header files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10 5.2 C library files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11 5.2.1 Core "T2" C library files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11 5.2.2 Wiggler C library files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12 5.2.3 Math C library files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 13 5.2.4 FFT C library files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 14 5.2.5 Miscellaneous C library files . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 15

6 References 15

1 Introduction

The main difference between the PASCAL version and the C version of TRACY-2 manifests itself in the fact that the C version is a library. In contrary the PASCAL version relied on the PASCAL-S compiler/interpreter developed by N. Wirth. This means that the PASCAL-S input file is replaced by a C program which is then linked with the TRACY library.

2. Installation 2

1.1 The PASCAL to C conversion

The conversion was performed utilizing the GNU p2c and f2c utility. The conversion went more or less smoothly (p2c did a good job !). The main work was spent on the reorganization of routines and data structures. Most of the routines available in the PASCAL version are still there, although some of them have slightly changed parameter lists. They are documented in section "Changed C library routines" (refer to 4.1 ()). Some routines were rewritten or added. New routines are documented in section "Added C library routines" (refer to 4.2 ()). Note: some of the routines namely the wiggler routines and the SVD routine taken from LAPACK) have been translated using f2c.

2 Installation

In order to compile the TRACY package successfully you have to provide recent versions of:

• gcc • p2c • f2c

If you have a LINUX system (lucky you !) this preriquisite should be already fulfilled. You will also need the

• Numerical Recipes library nrecipes-1p0.tar.gz

which is available via http://slsbd.psi.ch/tools/nrecipes/c/distrib/.

The documentation ist provided in SGML format. To generate tracy.ps (Source), tracy.html (Source) and tracy.txt (Source) from tracy.sgml (Source) you will need

• sgml-tools

The TRACY package is distributed as gzip’ed tape archive file

• tracy-x.xy.tar.gz

You can get it from http://slsbd.psi.ch/tools/tracy/distrib/. Make sure that you download the most recent stable version. Latest.tar.gz points to the latest stable version.

Move the file to a directory of your choice preferably something like ~/tracy/ and unpack the archive using the command gzip -cd tracy-version.tar.gz | tar xf -. Browse through the README file and edit the Makefile (Source) in order to make changes to the compiler flags. Eventually define the variable SYSNAME if you want to work simultaneously on various platforms. Set SYSNAME to the output of uname. Type make all to start the compilation. This will create the library libtracy.a with respect to ./$SYSNAME/lib/ and the documentation within ./doc/. Browse through the documentation before you continue.

Type make -f Makefile.example test to compile and link the test program tracytest.c. Have a look at the example Makefile (Source). It allows you to keep your extensions to TRACY at a different place as the distribution.

The holy source ist under RCS (Revision Control System) [1] control. The RCS files are not part of the distribution.

3. Getting started 3

3 Getting started

Have a quick look at the test program tracytest.c (Source):

#include <math.h>

#include "tracy.h" #include "datatyp.h" #include "physlib.h"

main() {

boolean chroma; double dP;

globvalrec globv; long lastpos;

t2init();

fi=fopen("sls.lat","r"); /* open the lattice input file */ fo=fopen("sls.out","w"); /* open the lattice output file */

if (Lattice_Read(&fi, &fo)) { /* read lattice */ Cell_Init(); /* initialize cell structure */

getglobv_(&globv);

/* define x/y aperture limits */ for (i = 0; i <= globval.Cell_nLoc; i++)

globv.maxampl[i][0] = globv.maxampl[i][1] = 1e0;

globv.MatMeth = false; globv.Cavity_on = false; globv.radiation = false; globv.emittance = false; globv.pathlength = false; globv.CODimax = 15; globv.bpm = ElemIndex("mon");

putglobv_(&globv);

chroma=true; dP=0.0;

getglobv_(&globv); printglob();

Ring_GetTwiss(chroma, dP); /* get Twiss parameters */

printglob(); /* print parameter list */ printlatt(); /* dump linear lattice functions into "linlat.dat" */

getcod(0.0, &lastpos); /* determine closed orbit */ printcod(); /* dump closed orbit into "cod.dat" */ } } This C program corresponds to the PASCAL inp file which was interpreted by the PASCAL-S interpreter which was itself written in PASCAL and part of TRACY. The inc files which were included at runtime by the PASCAL-S interpreter have been replaced by C headers. The master header file is tracy.h. It contains all definitions of data structures and routines contained in the TRACY library. As in the case of the PASCAL inc files there are high level header files containing routines which make use of the more basic library functions. physlib.h is a prominent example of such a header file (refer to 5.1 () for details).

4 TRACY C library routines

4.1 Changed C library routines

This section contains a description of routines which were changed since TRACY’s translation from PASCAL to C. For a description of the routines which were left untouched refer to the Tracy-2 manual by J. Bengtsson [2].

• gemit in physlib.h

Void gemit();

Calculates radiation integrals (emittances), damping times, fractional tunes and generalized sigma matrices ala CHAO. Requires DA mode and lattice with cavity to run. The global 3D array globval.ElemMat contains the 6x6 sigma matrices for all positions. See also printsigma.

• gcmat in lsoc.h

Void gcmat(long bpm, long bpmdis[mnp], long corr, long corrdis[mnp], long plane, double (*A)[mnp], double (*U)[mnp], double (*V)[mnp], double *w, long wdis[mnp], double (*Ai)[mnp])

Determine the corrector-bpm correlation matrix A:

----------- \/beta beta i j A = ------------- cos(nu pi - 2 pi|nu - nu |) ij 2 sin(pi nu) i j

and perform Singular Value Decomposition (SVD) of A for plane plane with A^-1 = Ai = V*w*U^T. Please refer to gcmatprint for the description of the remaining parameters.

• lsoc in physlib.h

Static Void lsoc(long niter, long bpm, long bpmdis[mnp], long corr, long corrdis[mnp], double maxkick, long maxbits, long plane, (*U)[mnp], (*V)[mnp], double *w);

Perform an orbit correction based on the SVD algorithm. Iterate niter times for plane plane. Please refer to gcmatprint for the description of the remaining parameters. See Numerical Recipes chapter 2.6 for an introduction to the SVD algorithm.

• GirSet in bcosys.h

Void GirSet(double gfrac, double jfrac, double efrac, double bfrac);

The rms girder alignment error defined in input file "bcosys.dat" ist multiplied with bfrac. The rms girder joints error ist multiplied with jfrac and the rms element error ist multiplied with efrac. If bfrac is != 0 GirSet simulates a simple beam-based alignment (BBA) procedure of qudrupoles with respect to adjacent monitors (method=1) or sextupoles with respect to adjacent monitors (method=2).

It simply correlates monitors-quadrupole (sextupole) combinations assuming a certain rms error of the aligment procedure. bfrac=0.1 would correspond to a BBA error which is 10 times smaller than the rms element error. The BBA settings are dumped to the file "bbaset.dat". The variable method is a local variable to GirSet. Angle errors of elements are now included for girders and elements. The rms angle is defined in "bcosys.dat" in micro degrees !-)

4.2 Added C library routines

This section contains a description of routines which were added since TRACY’s translation from PASCAL to C. For a description of the routines which were left untouched refer to the Tracy-2 manual by J. Bengtsson [2].

• getbumprec4a in t2bump.c Void getbumprec4a (long ncorr, long *corr, long plane, long corr1, long corr2, long corr3, long corr4, bumprec *bump);

calculate asymmetric closed orbit bump for 4 correctors corr1-4 and store kick ratios in bump • getbumprec4s in t2bump.c Void getbumprec4s (long ncorr, long *corr, long plane, long corr1, long corr2, long corr3, long corr4, bumprec *bump);

calculate symmetric closed orbit bump for 4 correctors corr1-4 and store kick ratios in bump • SetUpBump4a in t2bump.c Void SetUpBump4a (long ncorr, long *corr, double dnumin, long plane);

initialize ncorr asymmetric closed orbit bumps utilizing 4 adjacent coils around the machine with a minimal phase difference larger than dnumin for the plane plane.corr contains element numbers of the correction coils (See inibump in physlib.h for details).

• SetUpBump4s in t2bump.c Void SetUpBump4s (long ncorr, long *corr, double dnumin, long plane);

initialize ncorr symmetric closed orbit bumps utilizing 4 adjacent coils around the machine with a minimal phase difference larger than dnumin for the plane plane.corr contains element numbers of the correction coils (See inibump in physlib.h for details).

• InitBUMP4a in t2bump.c Void InitBUMP4a (long *ncorr, long *hcorr, long *vcorr, double dnuhmin, double dnuvmin);

initialize ncorr[0] horizontal and ncorr[1] vertical asymmetric closed orbit bumps utilizing 4 adjacent coils around the machine with a minimal phase difference larger than dnuhmin and dnuvmin for the horizontal and the vertical plane respectively. hcorr and vcorr contain element numbers of the correction coils (See inibump in physlib.h for details).

• InitBUMP4s in t2bump.c Void InitBUMP4s (long *ncorr, long *hcorr, long *vcorr, double dnuhmin, double dnuvmin);

initialize ncorr[0] horizontal and ncorr[1] vertical symmetric closed orbit bumps utilizing 4 adjacent coils around the machine with a minimal phase difference larger than dnuhmin and dnuvmin for the horizontal and the vertical plane respectively. hcorr and vcorr contain element numbers of the correction coils (See inibump in physlib.h for details).

• EigenVal in fit.c

Void EigenVal (double (*Ai)[mnp], long n, double *wr, double *wi);

calculate real wr and imaginary wi part of the eigenvalues for the matrix Ai. Uses routines from the Numerical Recipes library.

• QuadFit in fit.c

Void QuadFit (double *X, double *Y, long ndata, double *A, double Covar[][3], double *Chisq);

perform a least square quadratic fit to (X,Y) using ndata samples. A contains the coefficients of the fit and Chisq the 3x3 covariance matrix. Uses routines from the Numerical Recipes library.

• NormEigenVec in eigenv.c Void NormEigenVec (vector *Vr, vector *Vi, double *wr, double *wi, vector *t6a);

sort and normalize complex eigenvectors (Vr,Vi) with eigenvalues (wr,wi) and store the result in t6a. Used for the calculation of generalized sigma matrices ala CHAO in emit.

• ElemIndex in t2lat.c

long ElemIndex(Char *name);

return element family index. Note: in the PASCAL version the element family index could be comfortably accessed using the element name. This is no longer possible because we gave up on the interpretive PASCAL-S.

• Mpole_GetdT in t2elem.c double Mpole_GetdT(long Fnum1, long Knum1);

return total roll angle of the element Cell[ElemFam[Fnum1 - 1].KidList[Knum1 - 1]].Elem which is a sum of a design ,a systematic error and a random error part.

• Mpole_DefdTpar in t2elem.c double Mpole_DefdTpar(long Fnum1, long Knum1, double PdTpar);

Set design roll angle to PdTpar degrees. • Mpole_DefdTsys in t2elem.c double Mpole_DefdTsys(long Fnum1, long Knum1, double PdTsys);

Set systematic roll angle error to PdTsys degrees. • fft_double in fourierd.c void fft_double

( unsigned NumSamples, /* must be a power of 2 */ int InverseTransform, /* 0=forward FFT, 1=inverse FFT */ double *RealIn, /* array of input’s real samples */ double *ImaginaryIn, /* array of input’s imag samples */ double *RealOut, /* array of output’s reals */ double *ImaginaryOut ); /* array of output’s imaginaries */ performs a onedimensional fourier transform. Is an alternative to FFT.

• Circumference in physlib.h double Circumference();

returns the length of the ring.

• printsigma() in physlib.h

Void printsigma();

dump beam ellipse sigmas and twists calculated from generalized sigma matrices ala CHAO at every element to the file "sigma.dat".

• digitize in physlib.h

double digitize(double x, double maxkick, double maxsamp);

map x onto the integer interval (-maxsamp ... maxsamp) where maxsamp corresponds maxkick.

• Dis_In in physlib.h

Void Dis_In(long *bpmdis, long *vcorrdis, long *hcorrdis, long *wvdis, long *whdis)

Read a number of flag arrays from a plain text file named "dis.dat". The first line is always treated as a comment line. The first element on the following lines specifies the number of flags of type integer following on the same line. A space separated comment at the end of each line is allowed. bpmdis and v(h)corrdis are flag arrays marking bad bpm’s and vertical (horizontal) correctors (0=ok, 1=faulty). wv(h)dis defines which SVD w values belonging to the vertical (horizontal) motion are explicitly set to zero (0=keep value, 1=set value to zero) in order to reduce the influence of bpm noise.

• gcmatprint in lsoc.h

Void gcmatprint(long bpm, long bpmdis[mnp], long corr, long corrdis[mnp], long plane, double (*A)[mnp], double (*U)[mnp], double (*V)[mnp], double *w, long wdis[mnp], double (*Ai)[mnp])

dump result of Singular Value Decomposition (SVD) of the corrector-bpm correlation matrix A for plane plane performed by dsvdc with A^-1 = Ai = V*w*U^T to the file "svd.dat". bpm and corr are element family indices (see ElemIndex) of bpm’s and correctors. bpmdis and corrdis are flag arrays marking bad bpm’s and correctors (0=ok, 1=faulty). wdis defines which w values are set to zero (0=keep value, 1=set value to zero) in order to reduce the influence of bpm noise.

• minsq in cernlib.h

Void minsq(long mfun, long nvar, double *fm, double *xn, double *en, long iprint, long niter, long cov, double xstep)

Interface to the cernlib routine MINSQ which minimizes a sum of squares of functions:

mfun = number of functions nvar = number of variables fm = one-dim array for f1,f2,...,fm xn = one-dim array for x1,x2,...,xn en = starting incremint of xs iprint = print after iprint iterations 0=final print only ninter = number of iterations cov = =1 approx. error matrix printed, =0 otherwise xstep = initial step size searching for minimum along the line

xstep <=0.5 recommended

A one-dim dummy array wf[NW] with NW=200 is declared within minsq. Make sure that nvar+mfun(nvar+1)+3nvar(nvar+1)/2 does not exceed NW=200. The user has to define the following routine:

5. TRACY C library files 8

Void fcn(long mfun, long nvar, double *fm, double *xn, long iflag);

iflag is =1 for first entry, =4 for normal entry and =3 for the final entry after the minimum has been found. A maximum of MFUN=10 functions of NVAR=10 variables is supported. For detailed information refer to the cernlib writeups.

• minvar in cernlib.h

Void minvar(double *x,double *y, double *r, double *eps, double *step, long maxf, double a, double b, char *f)

Interface to the cernlib routine MINVAR which calculates to an attempted specified accuracy the abscissa of a local minimum of real-valued function f(x) lying in a given interval a,b together with the value of the function at the minimum:

x = estimate of the abscissa on exit estimate y = on exit f(x) r = on exit |x-x0|<r x0 x0=exact abscissa of a minimum of f eps = accuracy |x-x0|/(1+|x|)<=eps step = initial search step a,b = search interval f = function f(x) to be minimized

The user has to define a function f and parse a pointer to it to minvar:

float f(float *x, long *iflag)

iflag is =0 for first entry, and =1 for subsequent entries. For detailed information refer to the cernlib writeups.

• SkewCorr in corr.h

Void SkewCorr(long niter, double *xn, double *fm, double *rn, double eps, double step, long maxf, double a, double b)

Minimizes the emittance coupling based on minvar utilizing 3 families of skew quadrupoles in the long straight sections of the SLS (dsl11[p,m], dsl12[p,m], dsl13[p,m]). Starting skew values may be assigned before SkewCorr is invoked. The families are assumed to be orthogonal. In case of a small nonorthogonality the minimzation can be repeated niter times in order find the minimum:

niter = number of iterations xn[MFUN] = estimate of the abscissa on exit estimate fm[MFUN] = on exit f(x) rn[MFUN] = on exit |x-x0|<r x0 x0=exact abscissa of a minimum of f eps = accuracy |x-x0|/(1+|x|)<=eps step = initial search step a,b = search interval

5 TRACY C library files

5.1 C library header files

This section ontains a summary of all TRACY header files located ./include.

5. TRACY C library files 9

5.1.1 Main header files

tracy.h (Source)

RCS file: ./include/RCS/tracy.h,v Working file: ./include/tracy.h head: 1.2 total revisions: 3 description:

Main include file

datatyp.h (Source)

RCS file: ./include/RCS/datatyp.h,v Working file: ./include/datatyp.h head: 1.1 total revisions: 2 description:

magnet type definitions

physlib.h (Source)

RCS file: ./include/RCS/physlib.h,v Working file: ./include/physlib.h head: 1.2 total revisions: 3 description:

General physics routines

bcosys.h (Source)

RCS file: ./include/RCS/bcosys.h,v Working file: ./include/bcosys.h head: 1.2 total revisions: 3 description:

Girder and magnet misalignments

lsoc.h (Source)

RCS file: ./include/RCS/lsoc.h,v Working file: ./include/lsoc.h head: 1.2 total revisions: 3 description:

Orbit correction with SVD

mperr.h (Source)

RCS file: ./include/RCS/mperr.h,v Working file: ./include/mperr.h

5. TRACY C library files 10

head: 1.2 total revisions: 3 description:

Set multipole errors

dynacc.h (Source)

RCS file: ./include/RCS/dynacc.h,v Working file: ./include/dynacc.h head: 1.1 total revisions: 2 description:

Dynamic Aperture routines

cernlib.h (Source)

RCS file: ./include/RCS/cernlib.h,v Working file: ./include/cernlib.h head: 1.1 total revisions: 1 description:

wrappers for CERNLIB routines

corr.h (Source)

RCS file: ./include/RCS/corr.h,v Working file: ./include/corr.h head: 1.2 total revisions: 2 description:

routines for coupling correction

5.1.2 FFT header files

This subsection contains header files of the FFT package (see http://www.intersrv.com/~dcross/fft.html for details) which is a C subroutine library for computing the Discrete Fourier Transform (DFT) in one dimension. The .h files are located in ./include/fft/.

fourier.h (Source)

RCS file: ./include/fft/RCS/fourier.h,v Working file: ./include/fft/fourier.h head: 1.1 total revisions: 2 description:

Contains definitions for doing Fourier transforms and inverse Fourier transforms(belongs to Don Cross FFT package)

5. TRACY C library files 11

audfile.h (Source)

RCS file: ./include/fft/RCS/audfile.h,v Working file: ./include/fft/audfile.h head: 1.1 total revisions: 2 description:

A class for reading and writing AUD files (belongs to Don Cross FFT package)

ddc.h (Source)

RCS file: ./include/fft/RCS/ddc.h,v Working file: ./include/fft/ddc.h head: 1.1 total revisions: 2 description:

Generic ddclib stuff (belongs to Don Cross FFT package)

ddcmath.h (Source)

RCS file: ./include/fft/RCS/ddcmath.h,v Working file: ./include/fft/ddcmath.h head: 1.1 total revisions: 2 description:

Contains useful math stuff (belongs to Don Cross FFT package)

5.2 C library files

5.2.1 Core "T2" C library files

t2lat.c (Source)

RCS file: RCS/t2lat.c,v Working file: t2lat.c head: 1.2 total revisions: 3 description:

lattice file parser

t2ring.c (Source)

RCS file: RCS/t2ring.c,v Working file: t2ring.c head: 1.1 total revisions: 2 description:

Routines for closed beam lines

5. TRACY C library files 12

t2cell.c (Source)

RCS file: RCS/t2cell.c,v Working file: t2cell.c head: 1.2 total revisions: 3 description:

Routines for Cell manipulation

t2bump.c (Source)

RCS file: RCS/t2bump.c,v Working file: t2bump.c head: 1.1 total revisions: 2 description:

Routines for sliding bump orbit correction

t2elem.c (Source)

RCS file: RCS/t2elem.c,v Working file: t2elem.c head: 1.1 total revisions: 2 description:

Routines for element definition and manipulation

t2common.c (Source)

RCS file: RCS/t2common.c,v Working file: t2common.c head: 1.1 total revisions: 2 description:

Common global variables (relict from the old PASCAL days)

5.2.2 Wiggler C library files

etwigg.c (Source)

RCS file: RCS/etwigg.c,v Working file: etwigg.c head: 1.1 total revisions: 2 description:

first order symplectic integrator for wiggler using expanded Hamiltonian

gfwigg.c (Source)

RCS file: RCS/gfwigg.c,v Working file: gfwigg.c

5. TRACY C library files 13

head: 1.1 total revisions: 2 description:

Symplectic integrator for wiggler based on generating function

b2perp.c (Source)

RCS file: RCS/b2perp.c,v Working file: b2perp.c head: 1.1 total revisions: 2 description:

- - 2 - Calculates |B x e| , where e is a unit vector in the direction of propagation

5.2.3 Math C library files

fit.c (Source)

RCS file: RCS/fit.c,v Working file: fit.c head: 1.1 total revisions: 2 description:

Interface to fit routines from the Numerical Recipes Library

fft.c (Source)

RCS file: RCS/fft.c,v Working file: fft.c head: 1.1 total revisions: 2 description: FFT routine

svd.c (Source)

RCS file: RCS/svd.c,v Working file: svd.c head: 1.1 total revisions: 2 description:

Least-square closed orbit correction by singular value decomposition

dsvdc.c (Source)

RCS file: RCS/dsvdc.c,v Working file: dsvdc.c head: 1.1 total revisions: 2 description:

Linpack SVD routine

5. TRACY C library files 14

eigenv.c (Source)

RCS file: RCS/eigenv.c,v Working file: eigenv.c head: 1.1 total revisions: 2 description:

Eigenvalue routines

ety.c (Source)

RCS file: RCS/ety.c,v Working file: ety.c head: 1.1 total revisions: 2 description:

given a real general matrix, this subroutine reduces a submatrix situated in rows and columns low through igh to upper hessenberg form by orthogonal similarity transformations.

dab.c (Source)

RCS file: RCS/dab.c,v Working file: dab.c head: 1.1 total revisions: 2 description:

Differential Algebra routines

mathlib.c (Source)

RCS file: RCS/mathlib.c,v Working file: mathlib.c head: 1.2 total revisions: 3 description: Math routines

5.2.4 FFT C library files

This subsection contains C library files of the FFT package (see http://www.intersrv.com/~dcross/fft.html for details) which is a C subroutine library for computing the Discrete Fourier Transform (DFT) in one dimension.

fourierd.c (Source)

RCS file: RCS/fourierd.c,v Working file: fourierd.c head: 1.1 total revisions: 2 description:

Contains definitions for doing Fourier transforms with Don Cross package

6. References 15

fftmisc.c (Source)

RCS file: RCS/fftmisc.c,v Working file: fftmisc.c head: 1.1 total revisions: 2 description:

Helper routines for Fast Fourier Transform implementation by Don Cross

5.2.5 Miscellaneous C library files

dummy.c (Source)

RCS file: RCS/dummy.c,v Working file: dummy.c head: 1.1 total revisions: 2 description:

dummy routine for f2c library

stringlib.c (Source)

RCS file: RCS/stringlib.c,v Working file: stringlib.c head: 1.1 total revisions: 2 description:

Routines for string manipulation (relict from the old PASCAL days)

pascalio.c (Source)

RCS file: RCS/pascalio.c,v Working file: pascalio.c head: 1.1 total revisions: 2 description:

PASCAL i/o routines and initialization routines (relict from the old PASCAL days)

6 References

1. W.F. Tichy, RCS–A System for Version Control, Software–Practice & Experience 15, 7 (July 1985), 637-654.

2. J. Bengtsson, Tracy-2 User’s Manual, Feb 1997.